1. Years of Experience: 0/10
2. Experience Summary: 0/10
3. Skills: 4/10
4. Role: 0/10
5. Role Type: 0/10
6. Domain/Industry: 0/10
7. Projects Executed: 3/10

Overall descriptive explanation for the information completeness factor:
- The resume lacks clarity and information in most sections.
- There is no clear mention of years of experience or an experience summary.
- The skills section provides some information but lacks detail.
- The role, role type, and domain/industry sections are completely missing.
- The projects executed section provides some information but lacks detail and key achievements.